5 10 15 20 25 30 35 )c (GeV/ D Tp 0 1 2 3 4 5

Near-side peak yield

ALICE

Data

= 13 TeV s pp,

| < 1 ηΔ| c > 0.3 GeV/

assoc Tp

5 10 15 20 25 30 35 )c (GeV/ D Tp 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

Near-side peak width

PYTHIA8

All on

FSR, ISR off

FSR, ISR, MPI off

5 10 15 20 25 30 35 )c (GeV/ D Tp 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 β Near-side peak

5 10 15 20 25 30 35 )c (GeV/ D Tp 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

Away-side peak yield

5 10 15 20 25 30 35 )c (GeV/ D Tp 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

Away-side peak width

5 10 15 20 25 30 35 )c (GeV/ D Tp 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Baseline

ALI-PUB-527558

ALI-PUB-527558